\setupoutput[pdftex]
\mainlanguage[nl]
\usemodule[chemic]

\setupchemical[axis=on,frame=on]

\starttext

\placeformula
   \startformula
      \startchemical[width=fit]
         \chemical{H_2O}  
      \stopchemical   
    \stopformula

\stoptext