\setupoutput[pdftex]
\setuppapersize[A4,landscape][A4,landscape]
\usemodule[units]
\mainlanguage[en]
\setupbodyfont[ber,ppl,8pt]

\starttext
\chapter{Summary}

\starttablehead
	\HL
	\VL Step 1
	\VL Step 4
	\VL Step 9 
	\VL\FR
	\HL
\stoptablehead

\starttabletail
	\HL
\stoptabletail

\starttables[|l|plw(6cm)|plw(6cm)|]
\SetTableToWidth{\textwidth}
	\VL A 
	\VL D
	\VL \startitemize[1,packed]
		\item This is a first item
		\item This is a second item
	    \stopitemize
	\VL\MR
	\HL
	\VL A
	\VL D
	\VL \type{\startitemize[1,packed]} \blank[small]
		\type{\item} The item list continues. \blank[small]
		\type{\item} Help this is still not ready.\blank[small]
		\type{\item} The itemized column is not used up to the available width.
	    \type{\stopitemize}
	\VL\MR
	\HL
	\VL A
	\VL D Here a pagebreak should occur 
	\VL There follows another line of text. \blank[small] 
	    Other issues are implemented here. \blank[small] 
	    The list is not yet finished. But with the approach without \type{\startitemize} the column width is neither completely used.
    	\VL\LR
\stoptables
\stoptext
