% minimal file concerning bug in chart-module
% originallly posted by Henning Rhaban
% W. Egger
% 15.4.2004
\setupoutput[pdftex]
\usemodule[chart]

\startFLOWchart[test]
\startFLOWcell
   \name{BEGIN}
   \location{2,1}
   \shape{action}
   \text{Begin}
   \connection[b,b]{EINDE} %\connection[b,b] gives an error!
\stopFLOWcell

\startFLOWcell
   \name{EINDE}
   \location{3,1}
   \shape{action}
   \text{Einde}
\stopFLOWcell
\stopFLOWchart

\starttext
\FLOWchart[test]
\stoptext